# Copyright Verizon Media. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.

namespace=container.handler.threadpool

## Maximum number of thread in the thread pool
## 0 is translated to vcpu*4
maxThreads int default=0

## Minimum number of thread in the thread pool
## 0 is translated to vcpu*2
minThreads int default=0

## The number of seconds that excess idle threads will wait for new tasks before terminating
keepAliveTime double default=5.0

## Max queue size
queueSize int default=0

## The max time the container tolerates having no threads available before it shuts down to
## get out of a bad state. This should be set a bit higher than the expected max execution
## time of each request when in a state of overload, i.e about "worst case execution time*2"
maxThreadExecutionTimeSeconds int default=190

# Prefix for the name of the threads
name string default="default-pool"
