# Copyright Vespa.ai. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.
namespace=container.logging

# Name of the cluster
cluster             string

# Log directory name
logDirectoryName string default="qrs"

# Max queue length of file handler
queueSize int default=10000

# Buffer size for the output stream has a default of 256k
bufferSize int default=262144

# In hosted Vespa we do not use the clusterId in file names for application containers
useClusterIdInFileName bool default=true
