# Copyright 2017 Yahoo Holdings. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.

namespace=container.jdisc.config

# How far between snapshots. 5 minutes by default
snapshot_interval double default=300

# Initial status used in /state/v1/health API (value for 'code' in 'status'). See StateMonitor for valid values
initialStatus string default="up"
