# Copyright 2016 Yahoo Inc. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.
version=37
namespace=container

### All params must be flagged as 'restart' because this config is manually
### retrieved by ConfiguredApplication.start to init the rpc server in
### com.yahoo.container.Server.

## filedistributor rpc configuration
filedistributor.configid reference default="" restart

## Is RPC server enabled?
rpc.enabled bool default=false restart

## RPC server listen port
rpc.port int default=8086 restart

## Which interface to bind to.
rpc.host string default="" restart

## The id this service should register itself with in slobrok
rpc.slobrokId string default="" restart

## Whether to obtain coverage reports by default. This can be overridden with
## the 'reportcoverage' HTTP parameter.
coveragereports bool default=false restart

## A unique identifier string for this QRS. The only guarantee given is
## this string will be unique for every QRS in a Vespa application.
discriminator string default="qrserver.0" restart

## Force restart of container on deploy?
restartOnDeploy bool default=false restart
