# Copyright 2016 Yahoo Inc. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.
version=1

namespace=container.handler

maxthreads int default=500

# The max time the container tolerates having no threads available before it shuts down to
# get out of a bad state. This should be set a bit higher than the expected max execution
# time of each request when in a state of overload, i.e about "worst case execution time*2"
maxThreadExecutionTimeSeconds int default=190
