# Copyright 2017 Yahoo Holdings. Licensed under the terms of the Apache 2.0 license. See LICENSE in the project root.
namespace=vespa.hosted.dockerapi

caCertPath string default = ""
clientCertPath string default = ""
clientKeyPath string default = ""
uri string default = "unix:///host/var/run/docker.sock"

secondsToWaitBeforeKillingContainer int default = 10
maxPerRouteConnections int default = 10
maxTotalConnections int default = 100
connectTimeoutMillis int default = 100000 # 100 sec
readTimeoutMillis int default = 1800000 # 30 min

isRunningLocally bool default = false
imageGCMinTimeToLiveMinutes int default = 45
